<template>
  <ContentWrap>
    <!-- 搜索工作栏 -->
    <el-form
      class="-mb-15px"
      :model="queryParams"
      ref="queryFormRef"
      :inline="true"
      label-width="68px"
    >
      <el-row>
        <el-col :span="6">
          <el-form-item label="工位" prop="organizationId">
            <el-input
              v-model="queryParams.organizationId"
              placeholder="请输入工位"
              clearable
              @keyup.enter="handleQuery"
              class="!w-240px"
            />
          </el-form-item>
        </el-col>
        <el-col :span="6">
          <el-form-item label="机台" prop="machineId">
            <el-input
              v-model="queryParams.machineId"
              placeholder="请输入机台"
              clearable
              @keyup.enter="handleQuery"
              class="!w-240px"
            />
          </el-form-item>
        </el-col>
        <el-col :span="6">
          <el-form-item label="班组" prop="workTeamId">
            <el-input
              v-model="queryParams.workTeamId"
              placeholder="请输入班组"
              clearable
              @keyup.enter="handleQuery"
              class="!w-240px"
            />
          </el-form-item>
        </el-col>
        <el-col :span="6">
          <el-form-item label="备注" prop="remark">
            <el-input
              v-model="queryParams.remark"
              placeholder="请输入备注"
              clearable
              @keyup.enter="handleQuery"
              class="!w-240px"
            />
          </el-form-item>
        </el-col>
      </el-row>
      <el-row>
        <el-col :span="8">
          <el-form-item label="开始时间" prop="startTime">
            <el-date-picker
              v-model="queryParams.startTime"
              value-format="YYYY-MM-DD HH:mm:ss"
              type="daterange"
              start-placeholder="开始日期"
              end-placeholder="结束日期"
              :default-time="[new Date('1 00:00:00'), new Date('1 23:59:59')]"
              class="!w-240px"
            />
          </el-form-item>
        </el-col>
        <el-col :span="8">
          <el-form-item label="结束时间" prop="endTime">
            <el-date-picker
              v-model="queryParams.endTime"
              value-format="YYYY-MM-DD HH:mm:ss"
              type="daterange"
              start-placeholder="开始日期"
              end-placeholder="结束日期"
              :default-time="[new Date('1 00:00:00'), new Date('1 23:59:59')]"
              class="!w-240px"
            />
          </el-form-item>
        </el-col>
        <el-col :span="8">
          <el-form-item>
            <el-button @click="handleQuery"><Icon icon="ep:search" class="mr-5px" /> 搜索</el-button>
            <el-button @click="resetQuery"><Icon icon="ep:refresh" class="mr-5px" /> 重置</el-button>
            <el-button
              type="primary"
              plain
              @click="openForm('create')"
              v-hasPermi="['mes:record-template:create']"
            >
              <Icon icon="ep:plus" class="mr-5px" /> 新增
            </el-button>
            <el-button
              type="success"
              plain
              @click="handleExport"
              :loading="exportLoading"
              v-hasPermi="['mes:record-template:export']"
            >
              <Icon icon="ep:download" class="mr-5px" /> 导出
            </el-button>
          </el-form-item>
        </el-col>
      </el-row>
    </el-form>
  </ContentWrap>

  <!-- 列表 -->
  <ContentWrap>
    <el-table
      v-loading="loading"
      :data="list"
      :stripe="true"
      :show-overflow-tooltip="true"
      highlight-current-row
      @current-change="handleCurrentChange"
    >
      <el-table-column label="名称" align="center" prop="name" />
      <el-table-column label="工位" align="center" prop="organizationId" />
      <el-table-column label="机台" align="center" prop="machineId" />
      <el-table-column label="班组" align="center" prop="workTeamId" />
      <el-table-column
        label="开始时间"
        align="center"
        prop="startTime"
        :formatter="dateFormatter"
        width="180px"
      />
      <el-table-column
        label="结束时间"
        align="center"
        prop="endTime"
        :formatter="dateFormatter"
        width="180px"
      />
      <el-table-column label="状态" align="center" prop="status">
        <template #default="scope">
          <dict-tag :type="DICT_TYPE.MES_RECORD_STATUS" :value="scope.row.status" />
        </template>
      </el-table-column>
      <el-table-column label="工序" align="center" prop="recordType">
        <template #default="scope">
          <dict-tag :type="DICT_TYPE.MES_ORG_TYPE" :value="scope.row.recordType" />
        </template>
      </el-table-column>
      <el-table-column label="备注" align="center" prop="remark" />
      <el-table-column
        label="创建时间"
        align="center"
        prop="createTime"
        :formatter="dateFormatter"
        width="180px"
      />
      <el-table-column label="操作" align="center" fixed="right" width="130px">
        <template #default="scope">
          <el-button
            link
            type="primary"
            @click="openForm('update', scope.row.id)"
            v-hasPermi="['mes:record-template:update']"
          >
            编辑
          </el-button>
          <el-button
            link
            type="danger"
            @click="handleDelete(scope.row.id)"
            v-hasPermi="['mes:record-template:delete']"
          >
            删除
          </el-button>
        </template>
      </el-table-column>
    </el-table>
    <!-- 分页 -->
    <Pagination
      :total="total"
      v-model:page="queryParams.pageNo"
      v-model:limit="queryParams.pageSize"
      @pagination="getList"
    />
  </ContentWrap>

  <!-- 表单弹窗：添加/修改 -->
  <RecordTemplateForm ref="formRef" @success="getList" />
  <!-- 子表的列表 -->
  <ContentWrap>
    <el-tabs model-value="recordPinjian">
      <el-tab-pane label="检验记录" name="recordPinjian">
        <RecordPinjianList :record-id="currentRow.id" />
      </el-tab-pane>
    </el-tabs>
  </ContentWrap>
</template>

<script setup lang="ts">
import { getIntDictOptions, getStrDictOptions, getBoolDictOptions, DICT_TYPE } from '@/utils/dict'
import { dateFormatter } from '@/utils/formatTime'
import download from '@/utils/download'
import { RecordTemplateApi, RecordTemplateVO } from '@/api/mes/record'
import RecordTemplateForm from './RecordTemplateForm.vue'
import RecordPinjianList from './components/RecordPinjianList.vue'

/** 记录表 列表 */
defineOptions({ name: 'RecordTemplate' })

const message = useMessage() // 消息弹窗
const { t } = useI18n() // 国际化

const loading = ref(true) // 列表的加载中
const list = ref<RecordTemplateVO[]>([]) // 列表的数据
const total = ref(0) // 列表的总页数
const queryParams = reactive({
  pageNo: 1,
  pageSize: 10,
  name: undefined,
  organizationId: undefined,
  machineId: undefined,
  workTeamId: undefined,
  startTime: [],
  endTime: [],
  groupManagerApproveId1: undefined,
  groupManagerApproveId2: undefined,
  productionManagerApproveId1: undefined,
  productionManagerApproveId2: undefined,
  processInstanceId: undefined,
  status: undefined,
  recordType: undefined,
  remark: undefined,
  isEnable: undefined,
  createTime: []
})
const queryFormRef = ref() // 搜索的表单
const exportLoading = ref(false) // 导出的加载中

/** 查询列表 */
const getList = async () => {
  loading.value = true
  try {
    const data = await RecordTemplateApi.getRecordTemplatePage(queryParams)
    list.value = data.list
    total.value = data.total
  } finally {
    loading.value = false
  }
}

/** 搜索按钮操作 */
const handleQuery = () => {
  queryParams.pageNo = 1
  getList()
}

/** 重置按钮操作 */
const resetQuery = () => {
  queryFormRef.value.resetFields()
  handleQuery()
}

/** 添加/修改操作 */
const formRef = ref()
const openForm = (type: string, id?: number) => {
  formRef.value.open(type, id)
}

/** 删除按钮操作 */
const handleDelete = async (id: number) => {
  try {
    // 删除的二次确认
    await message.delConfirm()
    // 发起删除
    await RecordTemplateApi.deleteRecordTemplate(id)
    message.success(t('common.delSuccess'))
    // 刷新列表
    await getList()
  } catch {}
}

/** 导出按钮操作 */
const handleExport = async () => {
  try {
    // 导出的二次确认
    await message.exportConfirm()
    // 发起导出
    exportLoading.value = true
    const data = await RecordTemplateApi.exportRecordTemplate(queryParams)
    download.excel(data, '记录表.xls')
  } catch {
  } finally {
    exportLoading.value = false
  }
}

/** 选中行操作 */
const currentRow = ref({}) // 选中行
const handleCurrentChange = (row) => {
  currentRow.value = row
}

/** 初始化 **/
onMounted(() => {
  getList()
})
</script>
